\documentstyle[12pt]{report}
\textheight 8.5in
\textwidth 6.5in
%\oddsidemargin 0.0in
%\evensidemargin 0.0in
\oddsidemargin -0.25in
\evensidemargin -0.25in
\topmargin -0.5in
\def \ie {{\it i.e.}}
\def \eg {{\it e.g.}}
\def \etal {{\it et al.}}
\def \etc {{\it etc.}}
\def \IUE {{\it IUE}}
\def \degc {{$^\circ$C}}
\def \deg {{$^\circ$}}



